<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">#-------------------------------------------------------------------------------
# This is a MicroStation V8 Annotation Scale Definition file.
#
# $Copyright: (c) 2004 Bentley Systems, Incorporated. All rights reserved. $
#
# Lines that begin with # are for descriptive comments.
#-------------------------------------------------------------------------------
# The active scales.def file is used to drive the Annotation Scale factor in the 
# Models dialog box.  The left column is the name that is displayed it the dialog
# box. The right column is the scale that is used. The two columns are separated 
# by a semicolon ";"
#
# The location of the scales.def file can be set with the configuration variable
# MS_CUSTOMSCALEDEF. The default location of this file is \Workspace\system\data\.
#
#
#   Name        	Scale
MX base 1"=600';	7200:1
MX base 1"=500'; 	6000:1
MX base 1"=400';	4800:1
MX base 1"=300';	3600:1
MX base 1"=200';        2400:1  
MX base 1"=100';        1200:1  
MX base 1"=60';		720:1  
MX base 1"=50';         600:1 
MX base 1"=40';         480:1   
MX base 1"=30';         360:1   
MX base 1"=25';         300:1
MX base 1"=20';         240:1   
MX base 1"=10';		120:1  
MX sheet 1"=1'-0";       12:1
#Direct scale names
1:250,000;		250000:1
1:100,000;		100000:1
1:50,000;		50000:1
1:25,000;		25000:1
1:10,000;		10000:1
1:5000;			5000:1
1:1000;			1000:1
1:500;			500:1
1:400;			400:1 
1:384 &amp; 1/32"=1'-0";    384:1 
1:300;			300:1 
1:256 &amp; 3/64"=1'-0";    256:1
1:250;			250:1
1:200;			200:1
1:192 &amp; 1/16"=1'-0";    192:1
1:128 &amp; 3/32"=1'-0";    128:1
1:100;			100:1
1:96 &amp; 1/8"=1'-0";	96:1
1:64 &amp; 3/16"=1'-0";	64:1
1:60;			60:1
1:50;			50:1
1:48 &amp; 1/4"=1'-0";	48:1
1:40;			40:1
1:32 &amp; 3/8"=1'-0";	32:1
1:30;			30:1
1:25;			25:1
1:24 &amp; 1/2"=1'-0";	24:1
1:20;			20:1
1:16 &amp; 3/4"=1'-0";	16:1
1:12 &amp; 1�=1�-0		12:1
1:10;			10:1
1:8 &amp; 1 1/2"=1'-0";   	8:1
1:5;			5:1 
1:4 &amp; 3"=1'-0";		4:1
1:2.5;			2.5:1
1:2 &amp; 6"=1'-0";		2:1
Full Size 1=1;		1:1



	</pre></body></html>